include::doc/_common-settings.adoc[]

== OIOSI RASP Library for .NET

[options="header"]
|===
| Version | Branch | Release status | Description
| *3.1.0.RC1 (Current)* | *master* | *released* | RASP version 3.1.0
| *3.0.2.HOTFIX* | *master* | *released* | Corrected RaspConfiguration_Extended.Live.xml
| *3.0.2* | *master* | *released* | OIOUBL 2.1
| 3.0.1 | master | released | Hotfix: Improved exception handling in wcf-interceptor
| 3.0.0 | master | released | RASP version 3.0.0
4+|  xref:doc/OIORASP_Library_DotNet-ReleaseNotes.adoc#what_is_changed[View section "What is changed" for earlier releases]
|===

Nemhandel OIORASP .NET v{versionNumber}

include::doc/OIORASP_Library_DotNet-ReleaseNotes.adoc[]

include::doc/OIORASP_Library_DotNet-InstallationGuide.adoc[]

// include::doc/OIORASP_Library_DotNet-ReleaseNotes-CacheOverview.adoc[]

include::doc/OIORASP_Library_DotNet-Tutorials.adoc[]
