include::doc/_common-settings.adoc[]

== OIOSI RASP Library for .NET

[WARNING]
A security issue has been pointed out due to old versions of the Log4net component.
This issue requires a HotFix presented in *2.1.1 (Log4net Hotfix)*. The next stable version: *3.0.0* will have this issue addressed.

[options="header"]
|===
| Version | Branch | Release status | Description
| *3.0.0 (Current)* | *master* | *released* | RASP version 3.0.0
4+|  xref:doc/OIORASP_Library_DotNet-ReleaseNotes.adoc#what_is_changed[View section "What is changed" for earlier releases]
|===

Nemhandel OIORASP .NET v{versionNumber}

include::doc/OIORASP_Library_DotNet-ReleaseNotes.adoc[]

include::doc/OIORASP_Library_DotNet-InstallationGuide.adoc[]

// include::doc/OIORASP_Library_DotNet-ReleaseNotes-CacheOverview.adoc[]

include::doc/OIORASP_Library_DotNet-Tutorials.adoc[]
